en	Install Tool

en	Provides a simple link to the Install Tool. Notice the Install Tool (in typo3/install/) must be enabled.<br /><em>Access for 'admin' users only!</em>

en	Install

en	The Install Tool is locked

en	<p>For security reasons the Install Tool is locked by default.</p> <p>To enable the Install Tool, the file <strong>ENABLE_INSTALL_TOOL</strong> must be created in the directory <strong>typo3conf/</strong>.</p> <p>Just click the button below, the file will be created for you and the Install Tool will be unlocked.</p> <p><strong>Security note: </strong>When you are finished with your work, please log out of the Install Tool. Otherwise TYPO3 will automatically lock the Install Tool after one hour.</p>

en	Unlock the Install&#160;Tool

en	Confirm

en	Confirm with user password

en	Confirm with Install Tool password

en	Invalid password

en	Use user password instead

en	Use Install Tool password instead